#!/usr/bin/perl5

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Filesystem Mount Configuration</H2>
<P>
Depending on the type of filesystem being mounted, a number
of different options may apply.  These concern buffer and 
cache sizes, permission handling, network configuration
(for NFS mounts), quotas, filesystem checking behavior, etc.
Note that non-default use of some of these parameters may
result in security risks, data loss risks and possible 
hardware damage.  See your SGI server manual for further
details.
</P>
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>
EndOfFile
